20406080100120Energy level

0102030average cumulative wave 3 dose of

137CS in milliGrays

1/3 or less of pollution due to Chornobyl

1/3 to 2/3 of pollution due to Chornobyl more than 2/3 pollution ndue to Chornobyl

Effect of belief in % pollution due to Chornobyl by dose on Energy level in wave 3