0204060WHPpain subscale score

02468Average cumulative dose of

137CS low bfffpain8:le 67% hipain bfffpain8:gt 67%

bfffpain8 = max(0, BSIsoma -13)

bfffpain8 is condxly rescalled BSIsoma

Dose by bfffpain8 female wave 2 effect on WHPpain