0.1.2.3.4.5Density

-2-1012Chornobyl related health threat: wave 3 alpha = .8347477221944793

Kernel density estimate

Normal density

kernel = gaussian, bandwidth = 0.2238

Chornobyl related health threat summary score in wave 3