MiPTSD

× avgcumdosew2

Spline k=4.94

0.02.55.07.510.012.515.017.520.022.525.027.530.0 30

40

50

60

70

80

Average cumulative effective dose of

137 CS in wave two

Civilian PTSD scale score

Cubic spline formulation of Dose-PTSD relationship for males